-1 -0.5 0 0.5

Amplitude

0.5 1 1.5 2 2.5 3 3.5 4 4.5 Time (secs) 0

5

10

Frequency (kHz)

-140

-120

-100 -80 -60 -40

Power/frequency (dB/Hz)