-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 / -100

-50

0

50

Magnitude (dB)

Least-squares high-pass filter with M = 30

0 10 20 30 40 50 60 70 80 90 100 n -0.06

-0.04

-0.02 0 0.02

0.04

Sample

Predictions

noise prediction